-5 10^{-1}10^310^710^{11}10

)^{-1} s^{-2} eV cm

1 10 (a) Pion-decay dominated

-5 10^{-1}10^310^710^{11}10

dF/dE ( 2E

1 10 (b) Brems dominated

Energy (eV) -5 10^{-1}10^310^710^{11}10 1 10 (c) IC dominated